/*
 Navicat Premium Dump SQL

 Source Server         : qdhome.iot321.top-dev
 Source Server Type    : MySQL
 Source Server Version : 50740 (5.7.40-log)
 Source Host           : qdhome.iot321.top:33103
 Source Schema         : pla-chem-sim-dev-1

 Target Server Type    : MySQL
 Target Server Version : 50740 (5.7.40-log)
 File Encoding         : 65001

 Date: 13/12/2024 13:35:34
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for sim_task_fault
-- ----------------------------
DROP TABLE IF EXISTS `sim_task_fault`;
CREATE TABLE `sim_task_fault`  (
  `rel_id` bigint(20) NOT NULL AUTO_INCREMENT,
  `task_id` bigint(20) NOT NULL,
  `fault_id` char(12) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL DEFAULT '',
  `flag` char(1) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL DEFAULT '7' COMMENT '7:未知\r\n1:选中\r\n0:没有选中',
  `update_time` datetime NULL DEFAULT NULL ON UPDATE CURRENT_TIMESTAMP,
  PRIMARY KEY (`rel_id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 1 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci COMMENT = 'sim-任务故障关联表' ROW_FORMAT = DYNAMIC;

SET FOREIGN_KEY_CHECKS = 1;
